\begin{verbatim}
10.00000     H: atmospheric scale height (km) (used as a reference only)
0.0040       Typical pseudo-altitude (m) for 1st layer (z=H*log(sigma))
0.018       ,, ,,  ,, ,, ,, ,,  ,, ,, ,,  2nd layer, etc...
0.0400
0.1000
0.228200
0.460400
0.907000
1.73630
3.19040
5.54010
8.97780
13.5138
18.9666
25.0626
31.5527
38.4369
45.4369
52.4369
\end{verbatim}
