50.000
1.0
3.0
8.0
15.0
30.0
55.0
80.0
110.0
140.0
170.0 
200.0 
230.0
260.0
270.0 
300.0
330.0
360.0
390.0 
420.0 
450.0
480.0
510.0
540.0
570.0
600.0
630.0
660.0
690.0
720.0
