# gases
5
H2_
He_
CH4
C2H6
H2O
0.863
0.136
0.00207
7.6e-6
-1
# First line is number of gases
# Followed by gas names (always 3 characters)
# and then molar mixing ratios.
# mixing ratio -1 means the gas is variable.

