controle
aps
bps
ap
bp
aire
phisinit
tsurf
temp
ps
p
ISR
ASR
OLR
GND
ALB
ALBb
h2o_vap
h2o_vap_col
RH
h2o_ice
h2o_ice_col
h2o_vap_surf
h2o_ice_surf
rneb_lsc
rneb_man
CLF
CLFt
tau_col
H2Oice_reff

